\begin{rlandscape}
\centering
\begin{longtable}{
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}}
\caption{Hasil \textit{Coarse Grid-Search} Sensor B diurutkan berdasarkan \textit{rank test score}}
\label{tab:coarse grid results B}
\\
\toprule
\toprule
mean fit time & std fit time & mean score time & std score time & param pca  n components & param svc  C & param svc  gamma & param svc  kernel & mean test score & std test score & rank test score \\
\midrule
\endfirsthead

\toprule
\toprule
mean fit time & std fit time & mean score time & std score time & param pca  n components & param svc  C & param svc  gamma & param svc  kernel & mean test score & std test score & rank test score \\
\midrule
\endhead

\midrule
\multicolumn{11}{r}{\textit{berlanjut di halaman berikutnya}}
\endfoot

\bottomrule
\bottomrule
\endlastfoot

% Start of table content
39.63 & 1.65 & 2.88 & 0.23 & 512 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
30.49 & 1.15 & 2.16 & 0.19 & 512 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
29.69 & 0.62 & 1.86 & 0.16 & 512 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
20.28 & 1.59 & 1.00 & 0.10 & 256 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
22.79 & 0.62 & 1.25 & 0.10 & 256 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
23.17 & 0.46 & 1.06 & 0.07 & 256 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
11.41 & 0.74 & 0.21 & 0.04 & 64 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 7 \\
14.55 & 0.81 & 0.44 & 0.03 & 128 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 8 \\
11.39 & 0.82 & 0.22 & 0.04 & 64 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 9 \\
12.25 & 0.39 & 0.25 & 0.04 & 64 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 9 \\
15.41 & 1.24 & 0.48 & 0.05 & 128 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 11 \\
14.47 & 0.53 & 0.44 & 0.04 & 128 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 11 \\
41.95 & 1.36 & 3.28 & 0.27 & 512 & 0.00 & -10.00 & rbf & 1.00 & 0.00 & 13 \\
19.77 & 0.88 & 1.10 & 0.06 & 256 & 0.00 & -10.00 & rbf & 1.00 & 0.00 & 14 \\
13.43 & 0.24 & 0.22 & 0.04 & 32 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 15 \\
11.48 & 1.05 & 0.16 & 0.01 & 32 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 16 \\
13.80 & 2.12 & 0.21 & 0.02 & 32 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 16 \\
13.82 & 0.43 & 0.58 & 0.09 & 128 & 0.00 & -10.00 & rbf & 1.00 & 0.00 & 18 \\
32.47 & 4.05 & 1.22 & 0.14 & 512 & 10.00 & -15.00 & rbf & 1.00 & 0.00 & 19 \\
29.99 & 2.05 & 1.12 & 0.10 & 512 & 15.00 & -15.00 & rbf & 1.00 & 0.00 & 20 \\
15.26 & 1.09 & 0.16 & 0.03 & 32 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 21 \\
10.31 & 0.81 & 0.47 & 0.09 & 16 & 15.00 & -5.00 & rbf & 0.99 & 0.00 & 22 \\
10.91 & 0.79 & 0.46 & 0.08 & 16 & 5.00 & -5.00 & rbf & 0.99 & 0.00 & 22 \\
10.91 & 0.32 & 0.41 & 0.02 & 16 & 10.00 & -5.00 & rbf & 0.99 & 0.00 & 22 \\
12.04 & 1.08 & 0.53 & 0.22 & 16 & 0.00 & -5.00 & rbf & 0.99 & 0.00 & 25 \\
21.33 & 2.50 & 0.55 & 0.07 & 256 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 26 \\
12.21 & 0.68 & 2.08 & 0.24 & 32 & 10.00 & -5.00 & rbf & 0.99 & 0.00 & 27 \\
13.43 & 1.14 & 1.80 & 0.16 & 32 & 5.00 & -5.00 & rbf & 0.99 & 0.00 & 27 \\
14.51 & 1.63 & 2.15 & 0.23 & 32 & 15.00 & -5.00 & rbf & 0.99 & 0.00 & 27 \\
12.05 & 0.86 & 1.90 & 0.21 & 32 & 0.00 & -5.00 & rbf & 0.99 & 0.00 & 30 \\
21.03 & 1.59 & 0.57 & 0.05 & 256 & 10.00 & -15.00 & rbf & 0.99 & 0.00 & 31 \\
32.57 & 2.21 & 1.44 & 0.10 & 512 & 5.00 & -15.00 & rbf & 0.99 & 0.00 & 32 \\
21.09 & 1.19 & 0.72 & 0.06 & 256 & 5.00 & -15.00 & rbf & 0.99 & 0.00 & 33 \\
11.04 & 0.86 & 0.12 & 0.02 & 16 & 10.00 & -10.00 & rbf & 0.99 & 0.00 & 34 \\
12.41 & 0.67 & 0.38 & 0.05 & 64 & 0.00 & -10.00 & rbf & 0.99 & 0.00 & 35 \\
14.88 & 0.46 & 0.30 & 0.03 & 128 & 10.00 & -15.00 & rbf & 0.99 & 0.00 & 36 \\
13.66 & 0.29 & 0.16 & 0.04 & 64 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 37 \\
14.38 & 0.46 & 0.26 & 0.04 & 128 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 38 \\
10.82 & 0.53 & 0.18 & 0.03 & 16 & 5.00 & -10.00 & rbf & 0.99 & 0.00 & 39 \\
12.27 & 1.03 & 0.17 & 0.04 & 16 & 15.00 & -10.00 & rbf & 0.99 & 0.00 & 40 \\
18.20 & 0.48 & 0.17 & 0.05 & 16 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 41 \\
11.42 & 0.55 & 0.32 & 0.06 & 32 & 0.00 & -10.00 & rbf & 0.99 & 0.00 & 42 \\
16.15 & 0.73 & 0.53 & 0.12 & 128 & 5.00 & -15.00 & rbf & 0.99 & 0.00 & 43 \\
11.11 & 1.00 & 2.01 & 0.21 & 16 & -5.00 & -5.00 & rbf & 0.99 & 0.00 & 44 \\
12.20 & 0.69 & 0.19 & 0.04 & 32 & 10.00 & -15.00 & rbf & 0.98 & 0.00 & 45 \\
12.52 & 0.63 & 0.30 & 0.05 & 8 & 0.00 & -5.00 & rbf & 0.98 & 0.00 & 46 \\
11.20 & 0.12 & 0.31 & 0.06 & 64 & 5.00 & -15.00 & rbf & 0.98 & 0.00 & 47 \\
12.93 & 1.15 & 0.22 & 0.03 & 64 & 10.00 & -15.00 & rbf & 0.98 & 0.01 & 48 \\
35.29 & 5.11 & 0.17 & 0.05 & 8 & 15.00 & -10.00 & rbf & 0.98 & 0.00 & 49 \\
10.76 & 0.47 & 0.29 & 0.07 & 8 & 5.00 & -5.00 & rbf & 0.98 & 0.01 & 50 \\
20.97 & 2.37 & 0.24 & 0.09 & 8 & 10.00 & -10.00 & rbf & 0.97 & 0.00 & 51 \\
21.67 & 1.24 & 0.52 & 0.10 & 8 & 10.00 & -5.00 & rbf & 0.97 & 0.00 & 52 \\
11.56 & 0.74 & 0.27 & 0.03 & 8 & 15.00 & -5.00 & rbf & 0.97 & 0.00 & 53 \\
10.98 & 0.41 & 1.36 & 0.17 & 8 & -5.00 & -5.00 & rbf & 0.97 & 0.00 & 54 \\
10.89 & 1.19 & 0.42 & 0.07 & 16 & 0.00 & -10.00 & rbf & 0.97 & 0.00 & 55 \\
10.76 & 0.56 & 0.23 & 0.04 & 16 & 10.00 & -15.00 & rbf & 0.96 & 0.00 & 56 \\
11.71 & 1.25 & 0.39 & 0.13 & 32 & 5.00 & -15.00 & rbf & 0.96 & 0.00 & 57 \\
9.87 & 0.67 & 0.22 & 0.02 & 8 & 5.00 & -10.00 & rbf & 0.96 & 0.01 & 58 \\
20.68 & 0.69 & 6.92 & 0.40 & 256 & -5.00 & -10.00 & rbf & 0.96 & 0.00 & 59 \\
54.74 & 4.07 & 23.94 & 3.67 & 512 & -5.00 & -10.00 & rbf & 0.96 & 0.00 & 60 \\
18.02 & 0.81 & 5.02 & 0.70 & 128 & -5.00 & -10.00 & rbf & 0.95 & 0.00 & 61 \\
19.49 & 1.06 & 5.78 & 0.29 & 64 & 5.00 & -5.00 & rbf & 0.95 & 0.01 & 62 \\
23.89 & 1.21 & 6.69 & 0.32 & 64 & 10.00 & -5.00 & rbf & 0.95 & 0.01 & 62 \\
23.50 & 0.74 & 6.74 & 0.85 & 64 & 15.00 & -5.00 & rbf & 0.95 & 0.01 & 62 \\
43.30 & 1.96 & 12.07 & 0.52 & 512 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 65 \\
21.28 & 1.21 & 4.60 & 0.07 & 256 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 66 \\
13.36 & 0.42 & 2.99 & 0.13 & 64 & -5.00 & -10.00 & rbf & 0.95 & 0.00 & 67 \\
22.03 & 0.37 & 6.06 & 0.34 & 64 & 0.00 & -5.00 & rbf & 0.95 & 0.01 & 68 \\
15.26 & 0.59 & 2.88 & 0.15 & 128 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 69 \\
19.18 & 2.32 & 0.24 & 0.04 & 8 & 15.00 & -15.00 & rbf & 0.94 & 0.01 & 70 \\
13.60 & 0.79 & 2.30 & 0.11 & 32 & -5.00 & -10.00 & rbf & 0.94 & 0.00 & 71 \\
12.06 & 0.47 & 2.24 & 0.19 & 64 & 0.00 & -15.00 & rbf & 0.94 & 0.00 & 72 \\
10.80 & 0.94 & 0.41 & 0.07 & 16 & 5.00 & -15.00 & rbf & 0.94 & 0.00 & 73 \\
11.32 & 0.36 & 1.85 & 0.19 & 32 & 0.00 & -15.00 & rbf & 0.93 & 0.00 & 74 \\
12.67 & 0.51 & 0.75 & 0.12 & 8 & 0.00 & -10.00 & rbf & 0.91 & 0.00 & 75 \\
11.22 & 0.47 & 2.37 & 0.26 & 16 & -5.00 & -10.00 & rbf & 0.90 & 0.01 & 76 \\
9.97 & 0.57 & 0.41 & 0.05 & 8 & 10.00 & -15.00 & rbf & 0.89 & 0.02 & 77 \\
10.36 & 1.08 & 2.16 & 0.34 & 16 & 0.00 & -15.00 & rbf & 0.88 & 0.01 & 78 \\
13.77 & 0.36 & 0.40 & 0.05 & 4 & 5.00 & -5.00 & rbf & 0.88 & 0.01 & 79 \\
10.10 & 0.54 & 0.50 & 0.11 & 4 & 0.00 & -5.00 & rbf & 0.87 & 0.01 & 80 \\
10.38 & 0.95 & 0.58 & 0.09 & 8 & 5.00 & -15.00 & rbf & 0.87 & 0.00 & 81 \\
16.12 & 0.79 & 2.85 & 0.23 & 4 & 0.00 & 0.00 & rbf & 0.86 & 0.01 & 82 \\
26.82 & 2.04 & 0.27 & 0.04 & 4 & 10.00 & -5.00 & rbf & 0.86 & 0.02 & 83 \\
88.21 & 4.01 & 0.32 & 0.03 & 4 & 15.00 & -10.00 & rbf & 0.85 & 0.01 & 84 \\
287.33 & 21.19 & 0.14 & 0.03 & 4 & 15.00 & -5.00 & rbf & 0.85 & 0.02 & 85 \\
15.10 & 0.25 & 0.46 & 0.08 & 4 & 10.00 & -10.00 & rbf & 0.84 & 0.01 & 86 \\
11.62 & 0.69 & 1.85 & 0.11 & 4 & -5.00 & -5.00 & rbf & 0.84 & 0.00 & 87 \\
13.25 & 1.11 & 4.40 & 0.32 & 32 & -5.00 & -5.00 & rbf & 0.83 & 0.01 & 88 \\
19.04 & 0.51 & 2.53 & 0.25 & 4 & 5.00 & 0.00 & rbf & 0.82 & 0.00 & 89 \\
16.86 & 1.29 & 2.60 & 0.23 & 4 & 10.00 & 0.00 & rbf & 0.81 & 0.00 & 90 \\
15.92 & 1.29 & 2.48 & 0.40 & 4 & 15.00 & 0.00 & rbf & 0.81 & 0.00 & 91 \\
12.75 & 1.08 & 0.99 & 0.18 & 4 & 5.00 & -10.00 & rbf & 0.79 & 0.01 & 92 \\
10.57 & 0.60 & 2.52 & 0.23 & 8 & -5.00 & -10.00 & rbf & 0.79 & 0.01 & 93 \\
11.79 & 1.31 & 2.99 & 0.33 & 8 & 0.00 & -15.00 & rbf & 0.78 & 0.01 & 94 \\
28.25 & 0.68 & 10.82 & 0.49 & 128 & 10.00 & -5.00 & rbf & 0.78 & 0.01 & 95 \\
23.91 & 0.24 & 9.31 & 0.32 & 128 & 15.00 & -5.00 & rbf & 0.78 & 0.01 & 95 \\
22.74 & 1.25 & 8.30 & 0.37 & 128 & 5.00 & -5.00 & rbf & 0.78 & 0.01 & 95 \\
23.04 & 1.83 & 0.80 & 0.07 & 4 & 15.00 & -15.00 & rbf & 0.76 & 0.01 & 98 \\
31.40 & 1.74 & 6.17 & 0.29 & 8 & 10.00 & 0.00 & rbf & 0.76 & 0.00 & 99 \\
18.01 & 0.70 & 4.37 & 0.23 & 8 & 5.00 & 0.00 & rbf & 0.76 & 0.00 & 99 \\
23.46 & 2.44 & 6.29 & 0.69 & 8 & 15.00 & 0.00 & rbf & 0.76 & 0.00 & 99 \\
22.90 & 0.83 & 8.79 & 0.48 & 128 & 0.00 & -5.00 & rbf & 0.76 & 0.01 & 102 \\
18.40 & 0.65 & 4.71 & 0.15 & 8 & 0.00 & 0.00 & rbf & 0.74 & 0.01 & 103 \\
11.46 & 0.25 & 1.50 & 0.12 & 4 & 0.00 & -10.00 & rbf & 0.72 & 0.00 & 104 \\
11.15 & 0.41 & 1.16 & 0.05 & 4 & 10.00 & -15.00 & rbf & 0.70 & 0.01 & 105 \\
31.21 & 0.84 & 12.67 & 0.54 & 256 & 10.00 & -5.00 & rbf & 0.62 & 0.01 & 106 \\
29.16 & 0.72 & 13.20 & 0.91 & 256 & 5.00 & -5.00 & rbf & 0.62 & 0.01 & 106 \\
31.63 & 1.84 & 12.80 & 0.43 & 256 & 15.00 & -5.00 & rbf & 0.62 & 0.01 & 106 \\
11.71 & 0.92 & 2.31 & 0.17 & 4 & 5.00 & -15.00 & rbf & 0.59 & 0.01 & 109 \\
28.37 & 0.86 & 13.04 & 0.37 & 256 & 0.00 & -5.00 & rbf & 0.58 & 0.01 & 110 \\
12.91 & 0.17 & 5.06 & 0.26 & 4 & -5.00 & 0.00 & rbf & 0.57 & 0.01 & 111 \\
38.95 & 1.03 & 22.99 & 0.93 & 512 & 15.00 & -5.00 & rbf & 0.52 & 0.01 & 112 \\
43.47 & 1.32 & 21.46 & 1.80 & 512 & 10.00 & -5.00 & rbf & 0.52 & 0.01 & 112 \\
56.13 & 1.93 & 33.40 & 1.80 & 512 & 5.00 & -5.00 & rbf & 0.52 & 0.01 & 112 \\
12.08 & 0.95 & 3.63 & 0.28 & 4 & -5.00 & -10.00 & rbf & 0.49 & 0.01 & 115 \\
59.39 & 3.21 & 37.12 & 2.83 & 512 & 0.00 & -5.00 & rbf & 0.48 & 0.01 & 116 \\
11.15 & 0.54 & 3.39 & 0.30 & 4 & 0.00 & -15.00 & rbf & 0.45 & 0.01 & 117 \\
18.29 & 1.10 & 5.17 & 0.36 & 16 & 5.00 & 0.00 & rbf & 0.41 & 0.04 & 118 \\
18.70 & 0.76 & 5.89 & 0.13 & 16 & 10.00 & 0.00 & rbf & 0.41 & 0.04 & 118 \\
18.46 & 1.11 & 4.63 & 0.34 & 16 & 15.00 & 0.00 & rbf & 0.41 & 0.04 & 118 \\
21.28 & 0.87 & 6.36 & 0.73 & 16 & 0.00 & 0.00 & rbf & 0.37 & 0.04 & 121 \\
20.26 & 1.35 & 4.68 & 0.28 & 4 & 5.00 & 5.00 & rbf & 0.35 & 0.01 & 122 \\
19.26 & 1.28 & 4.61 & 0.50 & 4 & 10.00 & 5.00 & rbf & 0.35 & 0.01 & 122 \\
17.60 & 1.57 & 3.77 & 0.28 & 4 & 15.00 & 5.00 & rbf & 0.35 & 0.01 & 122 \\
17.67 & 1.23 & 5.26 & 0.67 & 4 & 0.00 & 5.00 & rbf & 0.33 & 0.01 & 125 \\
18.94 & 1.56 & 5.17 & 0.14 & 32 & 10.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
19.43 & 0.91 & 5.23 & 0.69 & 32 & 5.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
19.68 & 0.96 & 5.32 & 0.58 & 32 & 15.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
17.64 & 1.11 & 5.61 & 0.50 & 32 & 0.00 & 0.00 & rbf & 0.18 & 0.00 & 129 \\
23.99 & 1.88 & 6.74 & 0.31 & 64 & 15.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
19.78 & 0.82 & 5.87 & 0.59 & 64 & 5.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
24.28 & 1.97 & 6.50 & 0.72 & 64 & 10.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
19.46 & 0.69 & 6.47 & 0.76 & 64 & 0.00 & 0.00 & rbf & 0.15 & 0.00 & 133 \\
22.83 & 0.85 & 6.11 & 0.08 & 8 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 134 \\
25.67 & 2.30 & 5.26 & 0.62 & 8 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 134 \\
18.09 & 1.21 & 4.88 & 0.40 & 8 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 134 \\
26.87 & 2.05 & 9.54 & 0.96 & 128 & 10.00 & 0.00 & rbf & 0.14 & 0.00 & 137 \\
22.82 & 0.80 & 8.18 & 0.34 & 128 & 5.00 & 0.00 & rbf & 0.14 & 0.00 & 137 \\
25.45 & 2.61 & 9.58 & 0.52 & 128 & 15.00 & 0.00 & rbf & 0.14 & 0.00 & 137 \\
14.62 & 0.59 & 4.54 & 0.39 & 8 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 140 \\
21.15 & 1.40 & 9.55 & 0.28 & 128 & 0.00 & 0.00 & rbf & 0.14 & 0.00 & 141 \\
18.70 & 0.74 & 5.94 & 0.31 & 64 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
18.29 & 0.64 & 6.10 & 0.61 & 64 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
19.14 & 1.33 & 6.94 & 0.48 & 64 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
19.40 & 1.95 & 5.37 & 0.34 & 32 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
11.49 & 0.29 & 4.88 & 0.55 & 16 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
19.08 & 1.05 & 5.64 & 0.93 & 32 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
18.01 & 1.11 & 5.22 & 0.55 & 32 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
13.01 & 0.61 & 5.39 & 0.42 & 32 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
16.10 & 0.62 & 6.27 & 0.71 & 32 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
12.40 & 0.63 & 5.41 & 0.49 & 32 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
16.16 & 1.74 & 5.41 & 0.32 & 32 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
22.09 & 0.67 & 8.40 & 0.34 & 64 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
14.87 & 0.62 & 6.54 & 0.79 & 64 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
14.19 & 0.50 & 6.77 & 0.44 & 64 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 142 \\
15.11 & 1.67 & 6.90 & 0.78 & 64 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
28.10 & 1.07 & 9.40 & 0.43 & 128 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
27.71 & 0.36 & 12.87 & 0.48 & 256 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
17.81 & 0.82 & 8.55 & 0.44 & 128 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 142 \\
21.35 & 1.03 & 10.15 & 0.30 & 128 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
24.11 & 1.69 & 14.50 & 0.49 & 256 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
25.28 & 0.52 & 14.40 & 0.46 & 256 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
24.03 & 1.90 & 13.31 & 0.63 & 256 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
21.57 & 0.26 & 13.40 & 0.23 & 256 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 142 \\
45.39 & 1.01 & 22.44 & 0.21 & 512 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
39.60 & 1.70 & 21.35 & 0.61 & 512 & 10.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
37.37 & 1.35 & 22.79 & 0.81 & 512 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
41.59 & 2.41 & 22.59 & 0.84 & 512 & 15.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
51.53 & 1.28 & 34.79 & 2.38 & 512 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
61.98 & 2.19 & 44.70 & 5.92 & 512 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
51.97 & 2.36 & 37.98 & 1.31 & 512 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 142 \\
54.09 & 1.95 & 34.66 & 1.89 & 512 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
50.43 & 13.46 & 23.31 & 3.95 & 512 & 0.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
34.60 & 0.87 & 25.44 & 1.06 & 512 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
59.12 & 1.76 & 31.10 & 1.85 & 512 & 5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
58.71 & 2.68 & 24.94 & 0.90 & 512 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
14.93 & 0.19 & 6.10 & 0.33 & 64 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
23.19 & 0.99 & 8.43 & 0.42 & 128 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
22.54 & 0.35 & 8.50 & 0.09 & 128 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
28.93 & 1.50 & 12.57 & 0.59 & 256 & 10.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
27.90 & 0.85 & 16.03 & 0.28 & 256 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
25.92 & 1.36 & 13.94 & 1.43 & 256 & 0.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
28.25 & 0.66 & 13.30 & 1.44 & 256 & 5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
28.43 & 1.21 & 14.84 & 0.52 & 256 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
28.60 & 1.12 & 14.25 & 0.72 & 256 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
16.56 & 0.55 & 8.44 & 0.26 & 128 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
16.56 & 0.28 & 8.63 & 0.52 & 128 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
16.76 & 0.18 & 9.79 & 1.45 & 128 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
28.98 & 1.34 & 12.71 & 0.38 & 256 & 15.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
12.07 & 0.43 & 4.74 & 0.50 & 8 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
12.12 & 0.80 & 4.90 & 0.50 & 16 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
17.73 & 0.90 & 4.94 & 0.44 & 16 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
12.43 & 0.77 & 4.76 & 0.41 & 4 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
14.85 & 0.74 & 5.38 & 0.50 & 4 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
12.12 & 0.91 & 5.04 & 0.45 & 16 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 142 \\
20.29 & 1.26 & 5.73 & 0.74 & 16 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
11.72 & 0.21 & 4.94 & 0.22 & 8 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 142 \\
18.29 & 1.29 & 4.66 & 0.41 & 16 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
12.07 & 0.86 & 4.80 & 0.71 & 8 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
16.08 & 1.41 & 5.43 & 0.94 & 16 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 142 \\
\end{longtable}
\end{rlandscape}