\begin{rlandscape}
% \chapter*{Grid Search}
% \section*{Hasil Coarse Grid Search}
\centering
\begin{longtable}{
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}
    p{0.1\textwidth}}
\caption{Hasil \textit{Coarse Grid-Search} Sensor A diurutkan berdasarkan \textit{rank test score}}
\label{tab:coarse grid results A}
\\
\toprule
\toprule
mean fit time & std fit time & mean score time & std score time & param pca  n components & param svc  C & param svc  gamma & param svc  kernel & mean test score & std test score & rank test score \\
\midrule
\endfirsthead

\toprule
\toprule
mean fit time & std fit time & mean score time & std score time & param pca  n components & param svc  C & param svc  gamma & param svc  kernel & mean test score & std test score & rank test score \\
\midrule
\endhead

\midrule
\multicolumn{11}{r}{\textit{berlanjut di halaman berikutnya}}
\endfoot

\bottomrule
\bottomrule
\endlastfoot

% Start of table content
31.24 & 1.08 & 2.15 & 0.30 & 512 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
26.66 & 0.66 & 1.81 & 0.04 & 512 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
28.55 & 0.65 & 2.01 & 0.23 & 512 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 1 \\
17.84 & 0.57 & 0.87 & 0.09 & 256 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
18.42 & 0.74 & 0.98 & 0.18 & 256 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
17.89 & 0.38 & 0.89 & 0.13 & 256 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 4 \\
13.44 & 0.14 & 0.41 & 0.03 & 128 & 5.00 & -10.00 & rbf & 1.00 & 0.00 & 7 \\
16.85 & 0.45 & 0.52 & 0.08 & 128 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 7 \\
13.16 & 0.07 & 0.46 & 0.04 & 128 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 7 \\
13.47 & 0.58 & 0.26 & 0.05 & 64 & 10.00 & -10.00 & rbf & 1.00 & 0.00 & 10 \\
10.86 & 0.38 & 0.22 & 0.01 & 64 & 15.00 & -10.00 & rbf & 1.00 & 0.00 & 10 \\
29.77 & 1.96 & 2.46 & 0.15 & 512 & 0.00 & -10.00 & rbf & 1.00 & 0.00 & 12 \\
19.85 & 1.19 & 1.26 & 0.06 & 256 & 0.00 & -10.00 & rbf & 1.00 & 0.00 & 13 \\
10.46 & 0.05 & 0.15 & 0.01 & 32 & 10.00 & -10.00 & rbf & 0.99 & 0.00 & 14 \\
14.95 & 1.06 & 0.66 & 0.05 & 128 & 0.00 & -10.00 & rbf & 0.99 & 0.00 & 15 \\
12.48 & 0.53 & 0.19 & 0.05 & 32 & 5.00 & -10.00 & rbf & 0.99 & 0.00 & 16 \\
18.00 & 0.49 & 0.52 & 0.05 & 256 & 10.00 & -15.00 & rbf & 0.99 & 0.00 & 17 \\
12.51 & 1.25 & 0.16 & 0.01 & 32 & 15.00 & -10.00 & rbf & 0.99 & 0.00 & 18 \\
18.76 & 0.99 & 0.51 & 0.05 & 256 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 19 \\
27.92 & 0.95 & 1.16 & 0.08 & 512 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 20 \\
29.16 & 0.99 & 1.08 & 0.12 & 512 & 10.00 & -15.00 & rbf & 0.99 & 0.00 & 21 \\
13.58 & 0.52 & 0.19 & 0.01 & 64 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 22 \\
14.78 & 0.52 & 2.43 & 0.24 & 32 & 15.00 & -5.00 & rbf & 0.99 & 0.00 & 23 \\
12.06 & 0.10 & 2.08 & 0.08 & 32 & 10.00 & -5.00 & rbf & 0.99 & 0.00 & 23 \\
14.54 & 0.60 & 2.53 & 0.21 & 32 & 5.00 & -5.00 & rbf & 0.99 & 0.00 & 23 \\
15.50 & 0.71 & 0.18 & 0.04 & 32 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 26 \\
11.84 & 0.07 & 2.08 & 0.04 & 32 & 0.00 & -5.00 & rbf & 0.99 & 0.00 & 27 \\
28.30 & 1.53 & 1.51 & 0.17 & 512 & 5.00 & -15.00 & rbf & 0.99 & 0.00 & 28 \\
17.53 & 0.48 & 0.73 & 0.02 & 256 & 5.00 & -15.00 & rbf & 0.99 & 0.00 & 29 \\
10.54 & 0.41 & 0.49 & 0.09 & 16 & 0.00 & -5.00 & rbf & 0.99 & 0.00 & 30 \\
14.07 & 0.34 & 0.26 & 0.03 & 128 & 15.00 & -15.00 & rbf & 0.99 & 0.00 & 31 \\
10.48 & 0.19 & 0.42 & 0.02 & 16 & 5.00 & -5.00 & rbf & 0.99 & 0.00 & 32 \\
12.53 & 0.80 & 0.48 & 0.09 & 16 & 15.00 & -5.00 & rbf & 0.99 & 0.00 & 33 \\
10.44 & 0.20 & 0.41 & 0.04 & 16 & 10.00 & -5.00 & rbf & 0.99 & 0.00 & 33 \\
13.33 & 0.32 & 0.48 & 0.11 & 64 & 0.00 & -10.00 & rbf & 0.99 & 0.00 & 35 \\
10.67 & 0.09 & 0.13 & 0.02 & 16 & 10.00 & -10.00 & rbf & 0.99 & 0.00 & 36 \\
17.23 & 1.02 & 0.31 & 0.06 & 128 & 10.00 & -15.00 & rbf & 0.99 & 0.01 & 37 \\
15.70 & 0.96 & 0.14 & 0.03 & 16 & 15.00 & -10.00 & rbf & 0.99 & 0.00 & 38 \\
10.26 & 0.22 & 0.18 & 0.03 & 16 & 5.00 & -10.00 & rbf & 0.99 & 0.00 & 39 \\
13.18 & 0.44 & 0.44 & 0.04 & 128 & 5.00 & -15.00 & rbf & 0.98 & 0.00 & 40 \\
17.16 & 0.96 & 0.17 & 0.02 & 16 & 15.00 & -15.00 & rbf & 0.98 & 0.00 & 41 \\
11.53 & 0.14 & 0.23 & 0.02 & 64 & 5.00 & -10.00 & rbf & 0.98 & 0.01 & 42 \\
10.60 & 0.13 & 2.04 & 0.04 & 16 & -5.00 & -5.00 & rbf & 0.98 & 0.00 & 43 \\
13.92 & 1.42 & 0.24 & 0.04 & 64 & 10.00 & -15.00 & rbf & 0.98 & 0.01 & 44 \\
10.27 & 0.10 & 0.31 & 0.03 & 32 & 0.00 & -10.00 & rbf & 0.98 & 0.00 & 45 \\
11.37 & 0.28 & 0.31 & 0.02 & 64 & 5.00 & -15.00 & rbf & 0.97 & 0.00 & 46 \\
10.98 & 0.14 & 0.19 & 0.01 & 32 & 10.00 & -15.00 & rbf & 0.97 & 0.00 & 47 \\
10.88 & 0.36 & 0.23 & 0.02 & 8 & 5.00 & -5.00 & rbf & 0.97 & 0.00 & 48 \\
11.69 & 0.23 & 0.35 & 0.02 & 8 & 0.00 & -5.00 & rbf & 0.97 & 0.00 & 49 \\
30.52 & 1.52 & 0.13 & 0.02 & 8 & 15.00 & -10.00 & rbf & 0.96 & 0.01 & 50 \\
11.52 & 0.15 & 0.16 & 0.01 & 8 & 10.00 & -10.00 & rbf & 0.96 & 0.00 & 51 \\
12.01 & 0.30 & 0.24 & 0.02 & 8 & 10.00 & -5.00 & rbf & 0.96 & 0.00 & 52 \\
24.88 & 1.70 & 7.56 & 1.13 & 256 & -5.00 & -10.00 & rbf & 0.96 & 0.00 & 53 \\
27.66 & 2.04 & 12.21 & 0.98 & 512 & -5.00 & -10.00 & rbf & 0.96 & 0.00 & 54 \\
15.40 & 0.45 & 4.28 & 0.33 & 128 & -5.00 & -10.00 & rbf & 0.96 & 0.00 & 55 \\
19.85 & 0.15 & 6.14 & 0.48 & 64 & 15.00 & -5.00 & rbf & 0.96 & 0.00 & 56 \\
23.47 & 0.57 & 5.70 & 0.07 & 64 & 10.00 & -5.00 & rbf & 0.96 & 0.00 & 56 \\
19.63 & 0.16 & 5.54 & 0.14 & 64 & 5.00 & -5.00 & rbf & 0.96 & 0.00 & 56 \\
29.58 & 1.50 & 7.94 & 0.36 & 512 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 59 \\
19.24 & 0.80 & 4.87 & 0.43 & 256 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 60 \\
9.82 & 0.09 & 0.35 & 0.02 & 16 & 0.00 & -10.00 & rbf & 0.95 & 0.00 & 61 \\
10.24 & 0.07 & 1.33 & 0.01 & 8 & -5.00 & -5.00 & rbf & 0.95 & 0.00 & 62 \\
17.52 & 1.08 & 0.23 & 0.03 & 8 & 15.00 & -5.00 & rbf & 0.95 & 0.00 & 63 \\
10.21 & 0.16 & 0.21 & 0.01 & 16 & 10.00 & -15.00 & rbf & 0.95 & 0.00 & 64 \\
21.87 & 0.29 & 5.73 & 0.08 & 64 & 0.00 & -5.00 & rbf & 0.95 & 0.00 & 65 \\
12.06 & 0.80 & 0.37 & 0.04 & 32 & 5.00 & -15.00 & rbf & 0.95 & 0.00 & 66 \\
14.26 & 0.57 & 3.25 & 0.32 & 128 & 0.00 & -15.00 & rbf & 0.95 & 0.00 & 67 \\
12.17 & 0.08 & 2.76 & 0.07 & 64 & -5.00 & -10.00 & rbf & 0.95 & 0.00 & 68 \\
11.07 & 0.25 & 0.22 & 0.02 & 8 & 5.00 & -10.00 & rbf & 0.95 & 0.00 & 69 \\
16.92 & 1.59 & 0.19 & 0.02 & 8 & 15.00 & -15.00 & rbf & 0.94 & 0.00 & 70 \\
13.37 & 0.75 & 2.57 & 0.19 & 64 & 0.00 & -15.00 & rbf & 0.94 & 0.00 & 71 \\
11.83 & 0.16 & 0.41 & 0.03 & 16 & 5.00 & -15.00 & rbf & 0.93 & 0.00 & 72 \\
11.84 & 0.52 & 2.21 & 0.09 & 32 & -5.00 & -10.00 & rbf & 0.93 & 0.00 & 73 \\
10.99 & 0.12 & 1.90 & 0.07 & 32 & 0.00 & -15.00 & rbf & 0.92 & 0.00 & 74 \\
10.78 & 0.69 & 0.75 & 0.12 & 8 & 0.00 & -10.00 & rbf & 0.91 & 0.00 & 75 \\
9.66 & 0.10 & 0.33 & 0.02 & 8 & 10.00 & -15.00 & rbf & 0.90 & 0.00 & 76 \\
12.32 & 0.30 & 0.71 & 0.13 & 8 & 5.00 & -15.00 & rbf & 0.88 & 0.00 & 77 \\
10.62 & 0.12 & 2.16 & 0.09 & 16 & -5.00 & -10.00 & rbf & 0.87 & 0.01 & 78 \\
10.55 & 0.08 & 1.96 & 0.07 & 16 & 0.00 & -15.00 & rbf & 0.87 & 0.01 & 79 \\
21.82 & 0.43 & 7.86 & 0.32 & 128 & 5.00 & -5.00 & rbf & 0.81 & 0.01 & 80 \\
24.90 & 0.62 & 10.09 & 0.39 & 128 & 15.00 & -5.00 & rbf & 0.81 & 0.01 & 80 \\
22.31 & 0.65 & 8.05 & 0.27 & 128 & 10.00 & -5.00 & rbf & 0.81 & 0.01 & 80 \\
11.22 & 0.09 & 0.41 & 0.01 & 4 & 5.00 & -5.00 & rbf & 0.81 & 0.01 & 83 \\
9.93 & 0.15 & 0.66 & 0.04 & 4 & 0.00 & -5.00 & rbf & 0.81 & 0.00 & 84 \\
41.20 & 0.45 & 0.37 & 0.02 & 4 & 10.00 & -5.00 & rbf & 0.80 & 0.01 & 85 \\
112.24 & 4.87 & 0.50 & 0.03 & 4 & 15.00 & -10.00 & rbf & 0.80 & 0.01 & 86 \\
10.58 & 0.08 & 2.60 & 0.06 & 8 & -5.00 & -10.00 & rbf & 0.79 & 0.01 & 87 \\
13.87 & 0.22 & 2.50 & 0.21 & 4 & 0.00 & 0.00 & rbf & 0.79 & 0.01 & 88 \\
516.82 & 20.58 & 0.27 & 0.11 & 4 & 15.00 & -5.00 & rbf & 0.79 & 0.01 & 89 \\
27.24 & 0.86 & 8.13 & 0.20 & 128 & 0.00 & -5.00 & rbf & 0.79 & 0.01 & 90 \\
11.86 & 0.10 & 4.70 & 0.08 & 32 & -5.00 & -5.00 & rbf & 0.78 & 0.01 & 91 \\
10.34 & 0.06 & 2.62 & 0.20 & 8 & 0.00 & -15.00 & rbf & 0.78 & 0.01 & 92 \\
10.50 & 0.14 & 2.22 & 0.23 & 4 & -5.00 & -5.00 & rbf & 0.78 & 0.01 & 93 \\
17.73 & 0.80 & 0.83 & 0.04 & 4 & 10.00 & -10.00 & rbf & 0.77 & 0.01 & 94 \\
17.00 & 0.32 & 4.34 & 0.08 & 8 & 15.00 & 0.00 & rbf & 0.76 & 0.00 & 95 \\
18.86 & 0.56 & 5.68 & 0.24 & 8 & 10.00 & 0.00 & rbf & 0.76 & 0.00 & 95 \\
17.76 & 0.19 & 4.33 & 0.09 & 8 & 5.00 & 0.00 & rbf & 0.76 & 0.00 & 95 \\
21.32 & 0.61 & 5.04 & 0.20 & 8 & 0.00 & 0.00 & rbf & 0.74 & 0.00 & 98 \\
15.82 & 0.16 & 2.15 & 0.06 & 4 & 5.00 & 0.00 & rbf & 0.73 & 0.01 & 99 \\
17.37 & 0.63 & 2.10 & 0.09 & 4 & 10.00 & 0.00 & rbf & 0.72 & 0.01 & 100 \\
17.18 & 0.51 & 1.98 & 0.06 & 4 & 15.00 & 0.00 & rbf & 0.72 & 0.01 & 101 \\
10.20 & 0.17 & 1.08 & 0.03 & 4 & 5.00 & -10.00 & rbf & 0.71 & 0.01 & 102 \\
22.02 & 1.38 & 0.93 & 0.08 & 4 & 15.00 & -15.00 & rbf & 0.68 & 0.01 & 103 \\
10.80 & 0.53 & 1.95 & 0.06 & 4 & 0.00 & -10.00 & rbf & 0.62 & 0.01 & 104 \\
30.25 & 1.39 & 15.70 & 0.63 & 256 & 10.00 & -5.00 & rbf & 0.62 & 0.01 & 105 \\
26.77 & 0.36 & 12.15 & 0.34 & 256 & 15.00 & -5.00 & rbf & 0.62 & 0.01 & 105 \\
30.58 & 1.02 & 15.26 & 0.44 & 256 & 5.00 & -5.00 & rbf & 0.62 & 0.01 & 105 \\
11.07 & 0.34 & 1.73 & 0.09 & 4 & 10.00 & -15.00 & rbf & 0.62 & 0.01 & 108 \\
32.02 & 0.63 & 12.66 & 0.56 & 256 & 0.00 & -5.00 & rbf & 0.56 & 0.01 & 109 \\
12.40 & 0.16 & 5.08 & 0.27 & 4 & -5.00 & 0.00 & rbf & 0.55 & 0.01 & 110 \\
11.04 & 0.52 & 2.32 & 0.06 & 4 & 5.00 & -15.00 & rbf & 0.48 & 0.01 & 111 \\
44.42 & 1.45 & 24.44 & 1.18 & 512 & 15.00 & -5.00 & rbf & 0.46 & 0.00 & 112 \\
37.44 & 0.43 & 22.61 & 0.71 & 512 & 10.00 & -5.00 & rbf & 0.46 & 0.00 & 112 \\
42.09 & 1.07 & 21.07 & 0.85 & 512 & 5.00 & -5.00 & rbf & 0.46 & 0.00 & 112 \\
17.35 & 0.23 & 4.71 & 0.11 & 16 & 5.00 & 0.00 & rbf & 0.42 & 0.01 & 115 \\
17.59 & 0.35 & 4.71 & 0.05 & 16 & 15.00 & 0.00 & rbf & 0.42 & 0.01 & 115 \\
17.22 & 0.12 & 4.61 & 0.04 & 16 & 10.00 & 0.00 & rbf & 0.42 & 0.01 & 115 \\
44.66 & 1.22 & 23.29 & 0.56 & 512 & 0.00 & -5.00 & rbf & 0.39 & 0.01 & 118 \\
19.51 & 0.47 & 5.86 & 0.32 & 16 & 0.00 & 0.00 & rbf & 0.38 & 0.01 & 119 \\
10.71 & 0.13 & 3.63 & 0.06 & 4 & -5.00 & -10.00 & rbf & 0.37 & 0.01 & 120 \\
13.53 & 0.42 & 4.00 & 0.35 & 4 & 0.00 & -15.00 & rbf & 0.36 & 0.02 & 121 \\
17.12 & 0.50 & 4.44 & 0.34 & 4 & 5.00 & 5.00 & rbf & 0.34 & 0.01 & 122 \\
16.78 & 0.30 & 4.05 & 0.18 & 4 & 10.00 & 5.00 & rbf & 0.34 & 0.01 & 122 \\
18.46 & 2.10 & 5.13 & 0.75 & 4 & 15.00 & 5.00 & rbf & 0.34 & 0.01 & 122 \\
16.10 & 0.76 & 4.60 & 0.33 & 4 & 0.00 & 5.00 & rbf & 0.32 & 0.01 & 125 \\
18.63 & 0.21 & 4.84 & 0.05 & 32 & 10.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
20.68 & 0.70 & 4.92 & 0.07 & 32 & 5.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
22.36 & 0.58 & 5.87 & 0.18 & 32 & 15.00 & 0.00 & rbf & 0.19 & 0.00 & 126 \\
16.64 & 0.24 & 5.32 & 0.29 & 32 & 0.00 & 0.00 & rbf & 0.18 & 0.00 & 129 \\
20.19 & 1.12 & 6.95 & 0.70 & 64 & 15.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
19.28 & 0.16 & 6.36 & 0.77 & 64 & 5.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
21.26 & 1.52 & 5.85 & 0.21 & 64 & 10.00 & 0.00 & rbf & 0.16 & 0.00 & 130 \\
17.34 & 0.63 & 6.00 & 0.17 & 64 & 0.00 & 0.00 & rbf & 0.16 & 0.00 & 133 \\
21.99 & 1.49 & 8.32 & 0.58 & 128 & 5.00 & 0.00 & rbf & 0.15 & 0.00 & 134 \\
21.12 & 0.60 & 7.80 & 0.21 & 128 & 10.00 & 0.00 & rbf & 0.15 & 0.00 & 134 \\
25.10 & 0.71 & 9.52 & 1.36 & 128 & 15.00 & 0.00 & rbf & 0.15 & 0.00 & 134 \\
11.56 & 0.17 & 4.78 & 0.11 & 16 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 137 \\
16.92 & 0.06 & 4.50 & 0.07 & 8 & 15.00 & 5.00 & rbf & 0.15 & 0.00 & 138 \\
20.18 & 0.78 & 5.25 & 0.82 & 8 & 10.00 & 5.00 & rbf & 0.15 & 0.00 & 138 \\
16.83 & 0.38 & 4.40 & 0.08 & 8 & 5.00 & 5.00 & rbf & 0.15 & 0.00 & 138 \\
13.43 & 0.94 & 5.94 & 0.18 & 64 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 141 \\
17.33 & 0.83 & 8.54 & 0.77 & 128 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 142 \\
13.30 & 0.34 & 5.40 & 0.56 & 32 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 142 \\
16.80 & 0.50 & 5.29 & 0.38 & 8 & 0.00 & 5.00 & rbf & 0.15 & 0.00 & 144 \\
23.54 & 0.92 & 15.98 & 0.91 & 256 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 145 \\
11.36 & 0.07 & 4.45 & 0.06 & 8 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 146 \\
19.85 & 1.52 & 7.99 & 0.28 & 128 & 0.00 & 0.00 & rbf & 0.15 & 0.00 & 147 \\
27.08 & 0.77 & 19.92 & 0.43 & 512 & -5.00 & -15.00 & rbf & 0.15 & 0.00 & 148 \\
11.03 & 0.20 & 4.36 & 0.09 & 4 & -5.00 & -15.00 & rbf & 0.14 & 0.00 & 149 \\
16.95 & 0.42 & 4.92 & 0.05 & 32 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
19.52 & 1.29 & 5.37 & 0.27 & 32 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
21.07 & 0.47 & 8.03 & 0.12 & 128 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
12.91 & 0.19 & 6.00 & 0.08 & 64 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
12.93 & 0.15 & 5.88 & 0.16 & 64 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
17.89 & 0.42 & 5.02 & 0.12 & 32 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
15.22 & 1.12 & 6.18 & 0.61 & 32 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
12.13 & 0.03 & 5.16 & 0.08 & 32 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
20.80 & 0.44 & 7.74 & 0.34 & 64 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
12.13 & 0.05 & 5.16 & 0.06 & 32 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
17.84 & 0.55 & 8.08 & 0.55 & 128 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
38.17 & 2.80 & 21.36 & 0.56 & 512 & 0.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
33.34 & 1.27 & 22.83 & 0.43 & 512 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
30.86 & 0.80 & 25.89 & 0.73 & 512 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 150 \\
34.99 & 2.30 & 23.40 & 1.80 & 512 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
37.55 & 1.17 & 23.33 & 1.97 & 512 & 5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
34.88 & 1.47 & 22.61 & 1.22 & 512 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
40.39 & 1.06 & 21.87 & 0.57 & 512 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
38.87 & 2.02 & 23.14 & 1.56 & 512 & 10.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
42.60 & 3.30 & 22.25 & 0.58 & 512 & 15.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
40.82 & 1.90 & 23.89 & 0.86 & 512 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
13.18 & 0.23 & 5.91 & 0.09 & 64 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 150 \\
23.83 & 0.54 & 7.85 & 0.12 & 128 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
23.83 & 0.66 & 9.33 & 0.02 & 128 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
15.58 & 0.08 & 6.02 & 0.11 & 64 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
18.70 & 0.26 & 7.46 & 0.30 & 64 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
19.33 & 0.06 & 5.78 & 0.13 & 64 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
21.27 & 0.37 & 12.29 & 0.42 & 256 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
20.72 & 0.16 & 12.10 & 0.61 & 256 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
39.33 & 1.20 & 22.44 & 1.24 & 512 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
21.07 & 0.34 & 12.95 & 0.50 & 256 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 150 \\
23.94 & 1.20 & 12.06 & 0.47 & 256 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
25.49 & 1.69 & 12.61 & 0.57 & 256 & 0.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
30.38 & 1.31 & 14.00 & 1.13 & 256 & 5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
28.18 & 0.53 & 12.44 & 0.57 & 256 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
30.23 & 0.82 & 12.85 & 0.31 & 256 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
31.85 & 0.82 & 14.05 & 1.43 & 256 & 10.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
15.27 & 0.74 & 8.05 & 0.35 & 128 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
27.91 & 1.12 & 13.14 & 1.15 & 256 & 15.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
30.68 & 1.11 & 13.80 & 0.45 & 256 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
15.13 & 0.36 & 8.07 & 0.33 & 128 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
15.73 & 0.41 & 8.12 & 0.28 & 128 & -5.00 & -5.00 & rbf & 0.14 & 0.00 & 150 \\
16.97 & 0.17 & 4.76 & 0.09 & 16 & 5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
13.94 & 0.71 & 5.44 & 0.14 & 4 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
11.32 & 0.11 & 4.71 & 0.10 & 16 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
11.39 & 0.11 & 4.74 & 0.06 & 16 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
17.03 & 0.51 & 5.33 & 0.58 & 16 & 0.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
17.13 & 0.22 & 4.67 & 0.18 & 16 & 15.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
17.36 & 0.30 & 5.20 & 0.57 & 16 & 10.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
11.03 & 0.10 & 4.49 & 0.14 & 8 & -5.00 & 5.00 & rbf & 0.14 & 0.00 & 150 \\
11.15 & 0.07 & 4.44 & 0.09 & 8 & -5.00 & 0.00 & rbf & 0.14 & 0.00 & 150 \\
\end{longtable}
\end{rlandscape}